[[actuator.monitoring]]
== Monitoring and Management Over HTTP
If you are developing a web application, Spring Boot Actuator auto-configures all enabled endpoints to be exposed over HTTP.
The default convention is to use the `id` of the endpoint with a prefix of `/actuator` as the URL path.
For example, `health` is exposed as `/actuator/health`.

TIP: Actuator is supported natively with Spring MVC, Spring WebFlux, and Jersey.
If both Jersey and Spring MVC are available, Spring MVC is used.

NOTE: Jackson is a required dependency in order to get the correct JSON responses as documented in the API documentation ({spring-boot-actuator-restapi-docs}[HTML] or {spring-boot-actuator-restapi-pdfdocs}[PDF]).



[[actuator.monitoring.customizing-management-server-context-path]]
=== Customizing the Management Endpoint Paths
Sometimes, it is useful to customize the prefix for the management endpoints.
For example, your application might already use `/actuator` for another purpose.
You can use the configprop:management.endpoints.web.base-path[] property to change the prefix for your management endpoint, as the following example shows:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  endpoints:
	    web:
	      base-path: "/manage"
----

The preceding `application.properties` example changes the endpoint from `/actuator/\{id}` to `/manage/\{id}` (for example, `/manage/info`).

NOTE: Unless the management port has been configured to <<actuator#actuator.monitoring.customizing-management-server-port,expose endpoints by using a different HTTP port>>, `management.endpoints.web.base-path` is relative to `server.servlet.context-path` (for servlet web applications) or `spring.webflux.base-path` (for reactive web applications).
If `management.server.port` is configured, `management.endpoints.web.base-path` is relative to `management.server.base-path`.

If you want to map endpoints to a different path, you can use the configprop:management.endpoints.web.path-mapping[] property.

The following example remaps `/actuator/health` to `/healthcheck`:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  endpoints:
	    web:
	      base-path: "/"
	      path-mapping:
	        health: "healthcheck"
----



[[actuator.monitoring.customizing-management-server-port]]
=== Customizing the Management Server Port
Exposing management endpoints by using the default HTTP port is a sensible choice for cloud-based deployments.
If, however, your application runs inside your own data center, you may prefer to expose endpoints by using a different HTTP port.

You can set the configprop:management.server.port[] property to change the HTTP port, as the following example shows:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  server:
	    port: 8081
----

NOTE: On Cloud Foundry, by default, applications receive requests only on port 8080 for both HTTP and TCP routing.
If you want to use a custom management port on Cloud Foundry, you need to explicitly set up the application's routes to forward traffic to the custom port.



[[actuator.monitoring.management-specific-ssl]]
=== Configuring Management-specific SSL
When configured to use a custom port, you can also configure the management server with its own SSL by using the various `management.server.ssl.*` properties.
For example, doing so lets a management server be available over HTTP while the main application uses HTTPS, as the following property settings show:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	server:
	  port: 8443
	  ssl:
	    enabled: true
	    key-store: "classpath:store.jks"
	    key-password: "secret"
	management:
	  server:
	    port: 8080
	    ssl:
	      enabled: false
----

Alternatively, both the main server and the management server can use SSL but with different key stores, as follows:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	server:
	  port: 8443
	  ssl:
	    enabled: true
	    key-store: "classpath:main.jks"
	    key-password: "secret"
	management:
	  server:
	    port: 8080
	    ssl:
	      enabled: true
	      key-store: "classpath:management.jks"
	      key-password: "secret"
----



[[actuator.monitoring.customizing-management-server-address]]
=== Customizing the Management Server Address
You can customize the address on which the management endpoints are available by setting the configprop:management.server.address[] property.
Doing so can be useful if you want to listen only on an internal or ops-facing network or to listen only for connections from `localhost`.

NOTE: You can listen on a different address only when the port differs from the main server port.

The following example `application.properties` does not allow remote management connections:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  server:
	    port: 8081
	    address: "127.0.0.1"
----



[[actuator.monitoring.disabling-http-endpoints]]
=== Disabling HTTP Endpoints
If you do not want to expose endpoints over HTTP, you can set the management port to `-1`, as the following example shows:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  server:
	    port: -1
----

You can also achieve this by using the configprop:management.endpoints.web.exposure.exclude[] property, as the following example shows:

[source,yaml,indent=0,subs="verbatim",configprops,configblocks]
----
	management:
	  endpoints:
	    web:
	      exposure:
	        exclude: "*"
----
